-- 23-abr-2010 16:37:17 CDT
-- Default null to QtyInTransit
UPDATE AD_Column SET DefaultValue=NULL,Updated=TO_TIMESTAMP('2010-04-23 16:37:17','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Column_ID=53927
;

